/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50730
Source Host           : localhost:3306
Source Database       : socket

Target Server Type    : MYSQL
Target Server Version : 50730
File Encoding         : 65001

Date: 2020-12-22 08:27:06
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `username` varchar(255) NOT NULL,
  `password` varchar(255) NOT NULL,
  `is_online` int(255) unsigned NOT NULL,
  `port` int(255) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=8 DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES ('1', 'aa', 'aa111111', '1', '18000');
INSERT INTO `users` VALUES ('2', 'bb', 'bb111111', '1', '18001');
INSERT INTO `users` VALUES ('3', 'cc', 'cc1111111', '0', '18002');
INSERT INTO `users` VALUES ('4', 'dd', 'dd111111', '0', '18003');
INSERT INTO `users` VALUES ('7', 'huawei', '123456', '0', '18004');
